RUN: VlandCF252 Run11627 CF252

0 5 10 15 20 25 30 35 40 45 50 -1

-0.5

0

0.5

1 Channel Hits^{HHitChan}_{Entries 0}

Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Channel Hits

0 5 10 15 20 25 30 35 40 45 50 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

50000

Channel Rate (Hz)^{HRateChan}_{Entries 0}

Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Channel Rate (Hz)

0 10000 20000 30000 40000 50000 60000 70000 0

10

20

30

40

50 Channel Rate Histo (Hz)^{HRate}_{Entries 51}

Mean 0 RMS -0 Underflow 0 Overflow 0 Integral 51

Channel Rate Histo (Hz)

0 10 20 30 40 50 60 70 80 90 100 0 1 2 3 4 5 6 7 Event Raw Nhit^{HNhitRaw}_{Entries 40691}

Mean 0

RMS -0 Underflow 0 Overflow 4.068e+04 Integral 7

Event Raw Nhit

0 10 20 30 40 50 60 70 80 90 100 -1

-0.5

0

0.5

1 Event Nhit After Cuts^{HNhitCut}_{Entries 0}

Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Event Nhit After Cuts

0 20 40 60 80 100 120 140 160 180 200 -1

-0.5

0

0.5

1 All PMTs: TOffset^{HTOffsetAll}_{Entries 0}

Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

All PMTs: TOffset

0 20 40 60 80 100 120 140 160 180 -1

-0.5

0

0.5

1 Simple Split Events (Toffset 100 nsec) HSimpleSplit Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Simple Split Events (Toffset 100 nsec)

0 20 40 60 80 100 120 140 160 180 -1

-0.5

0

0.5

1 Simple Split Events, Neutron Cuts (Toffset 100 nsec) HSimpleSplitNeutron Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Simple Split Events, Neutron Cuts (Toffset 100 nsec)

0 20 40 60 80 100 120 140 160 180 -1

-0.5

0

0.5

1 Simple Split Events, Coincidence Cuts (Toffset 100 nsec) HSimpleSplitCoincidence Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Simple Split Events, Coincidence Cuts (Toffset 100 nsec)

0 10 20 30 40 50 60 70 80 90 100 -1

-0.5

0

0.5

1 Neutron Candidate Nhit HNeutronNhit Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Neutron Candidate Nhit

0 20 40 60 80 100 120 140 160 180 200 -1

-0.5

0

0.5

1 Neutron Candidate Charge (pe) HNeutronCharge Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Neutron Candidate Charge (pe)

0 5 10 15 20 25 -1

-0.5

0

0.5

1 Prompt window Nhit HPromptNhit Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Prompt window Nhit

0 5 10 15 20 25 30 35 40 45 50 -1

-0.5

0

0.5

1 Prompt window Charge (pe) HPromptCharge Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Prompt window Charge (pe)

0 10 20 30 40 50 60 70 80 90 100 -1

-0.5

0

0.5

1 Follower window Nhit HFollowerNhit Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Follower window Nhit

0 20 40 60 80 100 120 140 160 180 200 -1

-0.5

0

0.5

1 Follower window Charge (pe) HFollowerCharge Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0 Integral 0

Follower window Charge (pe)